# IDLE reads several config files to determine user preferences.  This 
# file is the default config file for idle highlight theme settings.  

[IDLE Classic Old - plain fonts]
normal-foreground= black
normal-background= white
normal-fontStyle= normal
keyword-foreground= #ff7700
keyword-fontStyle= normal
comment-foreground= #dd0000
comment-fontStyle= normal
string-foreground= #00aa00
string-fontStyle= normal
definition-foreground= #0000ff
definition-fontStyle= normal
hilite-foreground= #000068
hilite-background= #006868
hilite-fontStyle= normal
break-foreground= #ff7777
break-fontStyle= normal
hit-background= #000000
hit-foreground= #ffffff
hit-fontStyle= normal
cursor-foreround= black
error-background= #ff7777
#shell window
stdout-foreground= blue
stdout-fontStyle= normal
stderr-foreground= red
stderr-fontStyle= normal
console-foreground= #770000
console-fontStyle= normal

[IDLE Classic New]
normal-foreground= black
normal-background= white
normal-fontStyle= normal
keyword-foreground= #ff7700
keyword-fontStyle= bold
comment-foreground= #dd0000
comment-fontStyle= italic
string-foreground= #00aa00
string-fontStyle= normal
definition-foreground= #0000ff
definition-fontStyle= bold
hilite-foreground= #000068
hilite-background= #006868
break-foreground= #ff7777
hit-background= #000000
hit-foreground= #ffffff
cursor-foreground= black
error-background= #ff7777
#shell window
stdout-foreground= blue
stderr-foreground= red
console-foreground= #770000
