# IDLE reads several config files to determine user preferences.  This 
# file is the default config file for idle extensions settings.  

[FormatParagraph]
enable=1

[AutoIndent]
enable=1

[AutoExpand]
enable=1

[ZoomHeight]
enable=1

#[ScriptBinding]    # disabled in favor of ExecBinding
#enable=0

[ExecBinding]
enable=1

[CallTips]
enable=1

[ParenMatch]
enable=0
style= expression
flash-delay= 500
bell= 1
hilite-foreground= black
hilite-background= #43cd80
